18:42:23 -getInt-Variable Container Class-Variable not found: "connection.retry.delay";18:42:23 -getInt-Variable Container Class-Variable not found: "connection.retry.count";18:42:24 -create-Writer Manager Class-Writer already exists: dialog_writer_bold;18:42:47 -sendNavigate-Navigator Component Class-Node id is VOID;18:42:47 -GET-Variable Container Class-Variable not found: "tracking_header";18:42:47 -sendTrackingCall-Statistics Broker Javascript Class-Tracking header not in session.;18:42:47 -GET-Variable Container Class-Variable not found: "user_name";18:42:47 -GET-Variable Container Class-Variable not found: "user_customData";18:42:47 -GET-Variable Container Class-Variable not found: "user_figure";18:42:47 -getHumanPartImg-Figure Preview Class-Figure data not found!;18:42:47 -GET-Variable Container Class-Variable not found: "userLoggedIn";18:42:47 -handleDisconnect-Login Handler Class-Connection was disconnected: Info;