1:57:01 AM-getInt-Variable Container Class-Variable not found: "connection.retry.delay";1:57:01 AM-getInt-Variable Container Class-Variable not found: "connection.retry.count";1:57:11 AM-create-Writer Manager Class-Writer already exists: dialog_writer_bold;1:57:24 AM-create-Timeout Manager Class-Timeout already registered: spec_count_timer;1:58:00 AM-handleDisconnect-Login Handler Class-Connection was disconnected: Info;